= How to Set Nvidia as Primary GPU on Optimus-based Laptops
Akashdeep Dhar ; Jun Aruga ; Ankur Sinha; 
:revnumber: F37
:revdate: 2022-09-12
:category: Administration
:tags: How-to, Nvidia 
:page-aliases: how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops.adoc

//:imagesdir: ./images


include::{partialsdir}/3rdparty-message.adoc[]


== Introduction
The objective is to enable NVIDIA GPU of an Optimus-based laptop *all the time* and use it for every single activity.
Please do not use this guide if you want to render your desktop using the integrated GPU and specifically select applications to be rendered using the NVIDIA GPU.

[NOTE]
====
The steps listed here have been verified to be working on Fedora 32 Workstation. Please update your installation to include your experiences and any other tweaks that may be needed if you are using any other desktop environments.

Some guides on the internet advise a different approach to installing nVidia drivers on Fedora, such as directly using the binaries provided by nVidia. The Fedora Project cannot ensure these will always work on every Fedora release, and we therefore recommend following the steps in this document instead.
====

[NOTE]
====
As Prime works less satisfactorily with Wayland server, following the steps provided in this guide would default the server to Xorg.
====

[WARNING]
====
This guide requires the secure boot to be **turned off** to load up the unsigned NVIDIA kernel modules.
====

In order to make all the rendering default to the NVIDIA GPU, you need the follow the steps very carefully.

First, you need to see if you really want to achieve this.

=== Why would you want to do that?
* The use of NVIDIA GPU all the time would allow for smoother transitions and richer animation effects. Premium desktop environments like GNOME would benefit a lot from this.
* Enabling the NVIDIA GPU all the time would lead to lower CPU load and memory consumption which otherwise would have been high due to added in-memory video buffer.

=== Why would you not want to do that?
* With the NVIDIA GPU used all the time, there would be a slight increase in battery consumption which should not be a concern if your device is used while being plugged in.
* Increased generation of heat from the all-the-time enabled NVIDIA GPU can be worrisome. You would not want to play AAA-titles on Proton while placing your laptop on your lap.

== Step #1: Update from the existing repositories
Execute
----
sudo dnf upgrade
----
once to update all your packages first.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-0.png[]

== Step #2: Add the RPMFusion repository for NVIDIA drivers
Then you need to add the *RPM Fusion repository for NVIDIA drivers*. To do that, open up *GNOME Software* and click on the *hamburger menu* (three horizontal lines) on the top-right corner. Then click on *Software Repositories* from the dropdown menu. There you will see this.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-1.png[]

Select *RPM Fusion for Fedora 32 - Nonfree - NVIDIA Driver* and *ENABLE* it. It requires elevated privileges so enter your password and it will be done.

== Step #3: Update from the newly added repositories
Execute
----
sudo dnf upgrade --refresh
----
to fetch all available updates from the newly added repository.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-2.png[]

== Step #4: Install the driver and its dependencies
Execute
----
sudo dnf install gcc kernel-headers kernel-devel akmod-nvidia xorg-x11-drv-nvidia xorg-x11-drv-nvidia-libs xorg-x11-drv-nvidia-libs.i686
----
to get the driver and all necessary dependencies.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-3.png[]

== Step #5: Wait for the kernel modules to load up
You **must** wait 5-10 minutes for the kernel modules to load. Please do not proceed to the next steps immediately.

== Step #6: Read from the updated kernel modules
Execute
----
sudo akmods --force
sudo dracut --force
----
This would force the configuration to be read from the updated kernel modules which now have the NVIDIA drivers in them.

== Step #7: Reboot your system
Wait for 3-5 minutes for the changes to take effect and then reboot your system.

Once your system has started, go to the *About* page in the *Settings* application. You are likely to see the following output.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-4.png[]

This means that the driver installation was successful leading to the detection of two distinct video accelerators - internal and dedicated.

== Step #8: Edit the X11 configuration
Please ensure that the [application]`xrandr` package is installed before proceeding with this step:

----
sudo dnf install xrandr
----

Execute the following command to copy the display render details for the X11.

----
sudo cp -p /usr/share/X11/xorg.conf.d/nvidia.conf /etc/X11/xorg.conf.d/nvidia.conf
----

Once done, open up the `nvidia.conf` from the copy destination and edit it to add
----
Option "PrimaryGPU" "yes"
----
to the `OutputClass` section of it.

For example, use `nano`
----
sudo nano /etc/X11/xorg.conf.d/nvidia.conf
----
and make changes.

The file should look like this. Your file should look similar to this.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-5.png[]

You can see the additions in both sections.

Save it using `[Ctrl]+[S]` and exit out using `[Ctrl]+[X]`.

NOTE: If you are using a display manager other than GDM (the default of Fedora Workstation), you will need to configure it appropriately. Please refer https://wiki.archlinux.org/index.php/NVIDIA_Optimus#Display_managers[to the Arch wiki for instructions]. For SDDM (the KDE spin default) on Fedora32, the Arch wiki is _wrong_, and you need to edit the `/etc/sddm/Xsetup` file, _not_ `/usr/share/sddm/scripts/Xsetup`.

== Step #9: Reboot your system
Reboot your system and proceed to the next steps to verify the change in configuration.

== Step #10: Verify the configuration
Open a terminal and type in
----
glxinfo | egrep "OpenGL vendor|OpenGL renderer"
----
It should show your NVIDIA GPU.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-6.png[]

Check on `screenfetch`.
----
screenfetch
----
It should show your NVIDIA GPU under the GPU name.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-7.png[]

Check in your *Settings* application.
You would see something like this in the *About* page.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-8.png[]

You can make other configuration changes using *NVIDIA X Server Settings* application.
Also the GPU would show activity in its utilization percentage to signify that it is actually working.

image:how-to-set-nvidia-as-primary-gpu-on-optimus-based-laptops-9.png[]

== References
Should you face issues while following these steps or if these do not match your use case,
feel free to convey your queries on https://ask.fedoraproject.org[Fedora Forums].

Here are the links you can refer to for obtaining more information.

* https://rpmfusion.org/Howto/Optimus[RPMFusion's Optimus How-to guide]
* https://rpmfusion.org/Howto/NVIDIA[RPMFusion's NVIDIA How-to guide]
* https://unix.stackexchange.com/questions/16407/how-to-check-which-gpu-is-active-in-linux[GPU Activity on UNIX StackExchange]
* https://www.reddit.com/r/Fedora/comments/bw4b0p/how_to_fedora_nvidia_prime/[Fedora Subreddit (zvitaly’s response only)]
