= Using old graphics modes in bootloader
[[using-old-graphics-modes]]

The terminal device is chosen with GRUB_TERMINAL. For more information, see the link:http://www.gnu.org/software/grub/manual/grub.html#Simple-configuration[Grub manual].

Valid terminal output names depend on the platform, but may include
`console` (PC BIOS and EFI consoles), `serial` (serial terminal),
`gfxterm` (graphics-mode output), `ofconsole` (Open Firmware console),
or `vga_text` (VGA text output, mainly useful with Coreboot).

The default is to use the platform's native terminal output.

In Fedora, `gfxterm` is the default options. To get the legacy graphics modes:

.Procedure

. Edit the `/etc/default/grub` file.

. Set the `GRUB_TERMINAL` variable to one of the above mentioned options.

. Regenerate the *GRUB2* configuration file and reinstall the bootloader into the MBR, as described in xref:adding-other-operating-systems-grub2[Adding other operating systems to the *GRUB2* menu].


