[id='proc-configuring-xorg-as-default-gnome-session']
= Configuring GNOME to use Xorg

At the login screen, select the "gear" icon and select *GNOME on Xorg*.

image::configuring-xorg-as-default-gnome-session_2.png[Login screen - select GNOME on Xorg]

Once login is completed the X11 windowing system will be in use, as can be seen at *Settings* > *About*. This change will persist unless changed back at the login screen.


image::configuring-xorg-as-default-gnome-session_3.png[Settings - About]


== Changing the default GNOME session via configuration file

As an alternative, this change can be made by editing a configuration file `/etc/gdm/custom.conf`.

. Open `/etc/gdm/custom.conf` and uncomment `WaylandEnable=false`.

. Add the following line to the `[daemon]` section:

  DefaultSession=gnome-xorg.desktop

. Save the `custom.conf` file.

. Logout or reboot to enter the new session.
